(form "00035" (size 66 10)
  (heading "CHANGE WORKING DIRECTORY")
  (label (position  2  3) (text "Enter the name for the new working directory"))
  (label (position  2  5) (text "You may use either :"))
  (label (position  2  6) (text "1. an SSI logical name"))
  (label (position  2  7) (text "2. an absolute path name"))
  (label (position  2  8) (text "3. a relative path name"))
  (field "directory" (position  2  4) (display_length 60) (input allowed)
    (null allowed) (max_length 256)
    (directory))
  (default_buttons)
)
