(form "00072" (size 33 12) 
  (help "00072_TIP_0") 
  (heading "DEFINE THE SAMPLE FIELDS")
  (label (position  2  3) (text "Table"))
  (field "table" (position  8  3) (display_length 18)
    (background) (input disallowed))
  (scroll_block (position  3  6) (size 22  5)
     (extra  0  1)
     (scroll_size 22 10)
     (repeat interactive (grow  0  1) (instances  1 (min  1) (max 20)))
    (main)
    (top
      (label (position  1  0) (text "Field name")))
    (main
      (field "field" (position  1  0) (display_length 18) (input allowed)
        (null allowed) (max_length 18)))
  )

  (default_buttons)
)
