(form "00078" (size 63  6)
  (help "00078_TIP_0")
  (heading "DIGITISER SCALE")
  (label (position  2  3) (text "Scale"))
  (field "scale" (position 10  3) (display_length 40) (input disallowed))
  (default_buttons)
)
