(form "00099" (size 45 12)
  (help "00099_TIP_0")
  (heading "CONVERT DXF FILES TO STR FILES")
  (label (position  5  3) (text "Define the DXF files to convert"))
  (label (position  5  4) (text "Location"))
  (label (position  5  5) (text "ID range"))
  (label (position  5  6) (text "Output File"))
  (field "locn" (position 15  4) (display_length 26) (input allowed)
    (null allowed) (max_length "FIO_MAX_LOCATION_LENGTH")
    (file (link "lrange") (extension "*.dxf")) 
    (help "00099_TIP_1"))
  (field "lrange" (position 15  5) (display_length 26) (input allowed)
    (format range) (null allowed) (max_length 32)
    (help (field "locn")))
  (field "outputfile" (position 15  4) (display_length 26) (input allowed)
    (null allowed) (max_length "FIO_MAX_LOCATION_LENGTH")
    (help "00099_TIP_2"))    
  (default_buttons)
)
