(form "00106" (size 50 13)
  (help "00133_TIP_0")
  (heading "DEFINE ORDER FOR ENTRY OF GRID VALUES")
  (label (position  4  3) (text "1. Increasing X within increasing Y"))
  (label (position  4  4) (text "2. Decreasing X within increasing Y"))
  (label (position  4  5) (text "3. Increasing X within decreasing Y"))
  (label (position  4  6) (text "4. Decreasing X within decreasing Y"))
  (label (position  4  7) (text "5. Increasing Y within increasing X"))
  (label (position  4  8) (text "6. Decreasing Y within increasing X"))
  (label (position  4  9) (text "7. Increasing Y within decreasing X"))
  (label (position  4 10) (text "8. Decreasing Y within decreasing X"))
  (label (position  4 11) (text "Select entry option"))
  (field "seq" (position 26 11) (display_length  1) (input allowed)
    (low_bound 1) (high_bound 8)
    (default "1")
    (format integer_4) (null disallowed) (max_length 1))
  (default_buttons)
)
