(form "00195" (size 48 12)
  (help "00195_TIP_0")
  (heading "Linear regression of assays")
  (field "loc" (position 12  4) (display_length 26) (input allowed)
    (translate lower) (null allowed) (max_length 26)
    (file output (link "rid") (extension "*.str"))
    (help "00195_TIP_1"))
  (field "rid" (position 12  5) (display_length 16) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16)
    (help (field "loc")))
  (field "yname" (position 12  8) (display_length 32) (input allowed)
    (null disallowed) (max_length 32)
    (help "00195_TIP_2"))
  (field "xname" (position 12  9) (display_length 32) (input allowed)
    (null disallowed) (max_length 32)
    (help "00195_TIP_3"))
  (default_buttons)
)
