(form "00226" (size 74 21)
  (heading "PLOT PRESENTATION PARAMETERS")

  (field "plot" (position 16  3) (display_length 20) (input disallowed) (null allowed))
  (field "outputPrefix" (position 16  3) (display_length 20) (input allowed)(max_length "FIO_MAX_FILENAME_LENGTH"))

  (field "minscale" (position 10  1) (display_length  10) (input disallowed)
    (low_bound 0.01) (high_bound 999999999)
    (translate upper) (format real_8) (null allowed) (max_length 32))

  (field "uniform_scale" (position 50 15) (display_length  2) (input allowed)
    (value_in "Yes" "No") (default "No") (null disallowed) (max_length 4))
  
  (field "xscale" (position 6  1) (display_length  8) (input allowed)
    (low_bound 0.01) (high_bound 999999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    )

  (field "yscale" (position 23  1) (display_length  8) (input allowed)
    (high_bound 999999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    )

  (field "ymin" (position 10  1) (display_length 10) (input disallowed) (null allowed))
  (field "ymax" (position 10  2) (display_length 10) (input disallowed) (null allowed))
  (field "xmin" (position 23  1) (display_length 10) (input disallowed) (null allowed))
  (field "xmax" (position 23  2) (display_length 10) (input disallowed) (null allowed))

  (field "sheet" (position 15  4) (display_length  17) (input allowed)
    (null disallowed) (max_length 32) (translate upper)
    )

  (field "border" (position 15  5) (display_length  17) (input allowed)
    (null allowed) (max_length 32) (translate upper)
    )

  (field "drawsp" (position 15  6) (display_length  17) (input allowed)
    (null disallowed) (max_length 32) (translate upper)
    )

  (field "grid" (position 15 7) (display_length  17) (input allowed)
    (null allowed) (max_length 32) (translate upper)
    )

  (field "title" (position 15 8) (display_length  17) (input allowed)
    (dependency (value "border") != "")
    (null allowed) (max_length 32) (translate upper)
    )

  (field "orient" (position 15  9) (display_length  17) (input allowed)
    (value_in "NC" "RC" "NF" "RF" "RX" "RD")
    (default "NC")
    (translate upper) (null disallowed) (max_length 2)
    )

  (field "quad" (position 15 10) (display_length  12) (input allowed)
    (value_in "NE" "SE" "SW" "NW"
      [default "North-East" "South-East" "South-West" "North-West"])
    (default "NE")
    (translate upper) (null disallowed) (max_length 12)
    )

  (field "unit" (position 15 11) (display_length  12) (input allowed)
    (value_in "M" "I"
      [default "Metric" "Imperial"])
    (default "M")
    (null disallowed) (max_length 12)
    )

  (field "over" (position 15 12) (display_length  1) (input allowed)
    (value_in "Y" "N")
    (default "N")
    (translate upper) (null disallowed) (max_length 1)
    )

  (field "txtrot" (position 15 13) (display_length  1) (input allowed)
    (value_in "Y" "N")
    (default "N")
    (translate upper) (null disallowed) (max_length 1)
    )

  (menu (position 6 14) (size 24  1)
    (item (text "Save above values as defaults")
          (function "save_presentation_values_as_defaults")
    )
  )

  (field "display_plot" (position 40 15) (display_length  1) (input allowed)
    (value_in "Y" "N") (default "N")
    (translate upper) (null allowed) (max_length 1)
    )

  (field "oblique_grid_style" (position 15 7) (display_length  17) (input allowed)
    (null disallowed) (max_length 32)
    )
    
  (field "oblique_grid_string" (position 15 7) (display_length  17) (input allowed)
    (null disallowed) (max_length 32) (default "33000")
    )
    
  (field "oblique_grid_file" (position 15 7) (display_length  17) (input allowed)
    (null disallowed) (max_length "FIO_MAX_FILENAME_LENGTH")
    )
    
  (field "display_oblique_section_grid" (position 15 7) (display_length  17) (input allowed)
    (null disallowed) (max_length 1) (default "N")
    )
    
  (field "oblique_ygli" (position 15  4) (display_length 10) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (low_bound 0.000001) (default "1.0")
    )
  (field "oblique_yline" (position 15  5) (display_length  10) (input allowed)
    (value_in "F" "T" "N") (default "F")
    (null disallowed) (max_length 12)
    )
  (field "oblique_xgli" (position 30  4) (display_length 10) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (low_bound 0.000001) (default "1.0")
    )
  (field "oblique_xline" (position 30  5) (display_length  10) (input allowed)
    (value_in "F" "T" "N") (default "F")
    (null disallowed) (max_length 10)
    )
  
  (default_buttons)
)
