(form "00241" (size 58 16)
  (heading "RESHAPING")
  (label (position  7  3) (text "Define the section file"))
  (label (position  7  4) (text "Location"))
  (label (position  7  5) (text "ID number"))
  (label (position  7  6) (text "Section spacing"))
  (label (position  7  7) (text "Balance test value"))
  (label (position  7  9) (text "Define the slope file"))
  (label (position  7 10) (text "Location"))
  (label (position  7 11) (text "ID number"))
  (label (position  7 13) (text "Define the output file"))
  (label (position  7 14) (text "Location"))
  (field "loc" (position 27  4) (display_length 26) (input allowed)
    (null allowed) (max_length 26)
    (file (link "id") (extension "*.str")))
  (field "id" (position 27  5) (display_length 16) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16))
  (field "width" (position 27  6) (display_length 16) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16))
  (field "balance" (position 27  7) (display_length 16) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16))
  (field "slope" (position 27 10) (display_length 16) (input allowed)
    (null allowed) (max_length 16)
    (file (link "slope_id") (extension "*.str")))
  (field "slope_id" (position 27 11) (display_length 16) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16))
  (field "out" (position 27 14) (display_length 26) (input allowed)
    (null allowed) (max_length "FIO_MAX_LOCATION_LENGTH"))
  (default_buttons)
)
