(form "00266" (size 40  12)
  (help "00266_TIP_0")
  (heading "DATA RECORDER UPLOAD")
  (label (position 4 3) (text "The raw data recorder file"))
  (field "filename" (position 20 3)
    (display_length 12)
    (background (user_option "form_background"))
    (foreground (user_option "form_text_highlight"))
    (input disallowed)
  )
  (label (position 4 4) (text "has been created. You can now :"))
  (label (position 7 5) (text "1. Upload this file via a serial link"))
  (label (position 7 6) (text "2. Copy this file to another location"))
  (label (position 7 7) (text "3. Exit data recorder upload"))
  (label (position 4 9) (text "Selection"))
  (field "selection" (position 15  9) (display_length 9) (input allowed)
    (translate upper) (null disallowed) (max_length 6)
    (value_in "UPLOAD" "COPY" "EXIT")
     (default "UPLOAD"))
  (default_buttons)
)
