(form "00285" (size 41  9)
  (help "00285_TIP_0")
  (heading "VERIFY TRANSFORMATION PARAMETERS")
  (label (position  6  3) (text "Scale"))
  (label (position  6  4) (text "Rotation"))
  (label (position  6  5) (text "Shift Y"))
  (label (position  6  6) (text "Shift X"))
  (label (position  6  7) (text "Accept these adjustments"))
  (field "ptscale" (position 15  3) (display_length 16) (input disallowed))
  (field "rad_deg" (position 15  4) (display_length 16) (input disallowed))
  (field "shifty" (position 15  5) (display_length 16) (input disallowed))
  (field "shiftx" (position 15  6) (display_length 16) (input disallowed))
  (field "accept" (position 30  7) (display_length  1) (input allowed)
    (value_in "Y" "N")
    (translate upper) (null disallowed) (max_length 1))
  (default_buttons)
)
