(form "00316" (size 49 15)
  (help "00316_TIP_0")
  (heading "3D TRANSFORM")
  (label (position  2  3) (text "Define the directions from eye to view point"))
  (label (position  2  4) (text "Bearing"))
  (label (position 25  4) (text "Dip"))
  (label (position  2  6) (text "Define the transformation centre"))
  (label (position  2  7) (text "Y"))
  (label (position  2  8) (text "X"))
  (label (position  2  9) (text "Z"))
  (label (position  2 11) (text "Define the scaling parameters"))
  (label (position  5 12) (text "Y"))
  (label (position 20 12) (text "X"))
  (label (position 35 12) (text "Z"))
  (field "bearing" (position 10  4) (display_length 10) (input allowed)
    (low_bound 0) (high_bound 6.283180459)
    (translate upper) (format decimal_angle) (null disallowed) (max_length 10)
    (help "00316_TIP_1"))
  (field "dip" (position 34  4) (display_length 10) (input allowed)
    (low_bound -1.570796327) (high_bound 1.570796327)
    (translate upper) (format decimal_angle) (null disallowed) (max_length 10)
    (help (field "bearing")))
  (field "ycent" (position  5  7) (display_length 16) (input allowed)
    (translate upper) (format real_8) (decimals 6) (null disallowed) (max_length 16)
    (help "00316_TIP_2"))
  (field "xcent" (position  5  8) (display_length 16) (input allowed)
    (translate upper) (format real_8) (decimals 6) (null disallowed) (max_length 16)
    (help (field "ycent")))
  (field "zcent" (position  5  9) (display_length 16) (input allowed)
    (translate upper) (format real_8) (decimals 6) (null disallowed) (max_length 16)
    (help (field "ycent")))
  (field "yscale" (position  9 12) (display_length  6) (input allowed)
    (translate upper) (format real_8) (decimals 6) (null disallowed) (max_length 16)
    (help "00316_TIP_3"))
  (field "xscale" (position 24 12) (display_length  6) (input allowed)
    (translate upper) (format real_8) (decimals 6) (null disallowed) (max_length 16)
    (help (field "yscale")))
  (field "zscale" (position 39 12) (display_length  6) (input allowed)
    (translate upper) (format real_8) (decimals 6) (null disallowed) (max_length 16)
    (help (field "yscale")))
  (default_buttons)
)
