(form "00322" (size 66  6) (mismatch ignore)
  (help "00322_TIP_0")
  (heading "DEFINE THE METHOD FOR PROCESSING TIME INDEPENDENT SAMPLES")
  (label (position  5  3) (text "Method"))
  (field "method" (position 15  3) (display_length 16) (input allowed)
    (value_in "all samples" 
              "first sample" 
              "last sample" 
              "minimum sample" 
              "maximum sample")
    (translate lower) (null allowed) (max_length 16))
  (default_buttons)
)
