(form "00476" (size 43 21)
    (help "00476_TIP_0")
  (heading "DEFINE THE COMPOSITING CRITERIA")

  (label (position  2  3) (text "Table"))
  (label (position  2  4) (text "Define the field to which an upper limit is to apply"))
  (label (position  2  5) (text "Field name"))
  (label (position  2  7) (text "Define the field to which a lower limit is to apply"))
  (label (position  2  8) (text "Field name"))
  (label (position  2 10) (text "Define the geology code to use for overburden"))
  (label (position  2 11) (text "Geo code"))
  (label (position  2 13) (text "Number of zones"))
  (label (position  4 14) (text "Geo Code"))
  (label (position 17 14) (text "Upper Limit"))
  (label (position 30 14) (text "Lower Limit"))
  (label (position  2 15) (text "1."))
  (label (position  2 16) (text "2."))
  (label (position  2 17) (text "3."))
  (label (position  2 18) (text "4."))
  (label (position  2 19) (text "5."))
  (field "asstable" (position 12  3) (display_length 18)
    (background) (input disallowed))
  (field "ashfield" (position 12  5) (display_length 18) (input allowed)
    (translate lower) (null disallowed) (max_length 18)
    (help "00476_TIP_1")
  )
  (field "volfield" (position 12  8) (display_length 18) (input allowed)
    (translate lower) (null disallowed) (max_length 18)
    (help "00476_TIP_2")
  )
  (field "ovbcode" (position 12 11) (display_length 10) (input allowed)
    (null allowed) (max_length 10)
    (help "00476_TIP_3")
  )
  (field "ncrit" (position 17 13) (display_length  2) (input allowed)
    (low_bound 1) (high_bound 5)
    (format integer_4) (null disallowed) (max_length 2)
    (help "00476_TIP_4")
  )
  (field "geocode1" (position  4 15) (display_length 10) (input allowed)
    (null allowed) (max_length 10)
    (help "00476_TIP_5")
  )
  (field "ashmax1" (position 17 15) (display_length 10) (input allowed)
    (low_bound 0) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_6")
  )
  (field "volmin1" (position 30 15) (display_length 10) (input allowed)
    (low_bound -1) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_7")
  )
  (field "geocode2" (position  4 16) (display_length 10) (input allowed)
    (null allowed) (max_length 10)
    (help "00476_TIP_5")
  )
  (field "ashmax2" (position 17 16) (display_length 10) (input allowed)
    (low_bound 0) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_6")
  )
  (field "volmin2" (position 30 16) (display_length 10) (input allowed)
    (low_bound -1) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_7")
  )
  (field "geocode3" (position  4 17) (display_length 10) (input allowed)
    (null allowed) (max_length 10)
    (help "00476_TIP_5")
  )
  (field "ashmax3" (position 17 17) (display_length 10) (input allowed)
    (low_bound 0) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_6")
  )
  (field "volmin3" (position 30 17) (display_length 10) (input allowed)
    (low_bound -1) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_7")
  )
  (field "geocode4" (position  4 18) (display_length 10) (input allowed)
    (null allowed) (max_length 10)
    (help "00476_TIP_5")
  )
  (field "ashmax4" (position 17 18) (display_length 10) (input allowed)
    (low_bound 0) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_6")
  )
  (field "volmin4" (position 30 18) (display_length 10) (input allowed)
    (low_bound -1) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_7")
  )
  (field "geocode5" (position  4 19) (display_length 10) (input allowed)
    (null allowed) (max_length 10)
    (help "00476_TIP_5")
  )
  (field "ashmax5" (position 17 19) (display_length 10) (input allowed)
    (low_bound 0) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_6")
  )
  (field "volmin5" (position 30 19) (display_length 10) (input allowed)
    (low_bound -1) (high_bound 999999)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "00476_TIP_7")
  )
  (default_buttons)
)
