(form "00479" (size 58 15)
  (heading "DEFINE PCG2 PACKAGE PARAMETERS - POLYNOMIAL METHOD")
  (label (position  2  3) (text "Head change convergence criterion"))
  (label (position  2  4) (text "Residual convergence criterion"))
  (label (position  2  5) (text "Upper bound on Max Eigen value"))
  (label (position  2  6) (text "1 - Calculate"))
  (label (position  2  7) (text "2 - Set value to 2"))
  (label (position  2  9) (text "Printout interval for PCG2"))
  (label (position  2 10) (text "Printout for the solver"))
  (label (position  2 11) (text "0 - Print head changes and iterations"))
  (label (position  2 12) (text "1 - Print number of iterations only"))
  (label (position  2 13) (text "2 - Suppress all output"))
  (field "hclose" (position 35  3) (display_length 16) (input allowed)
    (low_bound 0.000000001) (high_bound 1000)
    (translate upper) (format real_8) (null disallowed) (max_length 16))
  (field "rclose" (position 35  4) (display_length 16) (input allowed)
    (low_bound 0.000000001) (high_bound 100000000)
    (translate upper) (format real_8) (null disallowed) (max_length 16))
  (field "nbpol" (position 35  5) (display_length 16) (input allowed)
    (low_bound 1) (high_bound 2)
    (format integer_4) (null disallowed) (max_length 16))
  (field "iprpcg" (position 35  9) (display_length  5) (input allowed)
    (low_bound 0) (high_bound 999)
    (format integer_4) (null disallowed) (max_length 5))
  (field "mutpcg" (position 35 10) (display_length  1) (input allowed)
    (low_bound 0) (high_bound 2)
    (format integer_4) (null disallowed) (max_length 1))
  (default_buttons)
)
