(form "00486" (size 58 15)
  (help "00486_TIP_0")
  (heading "RECALL AND DISPLAY SAMPLES FOR GRADE CONTROL")
  (label (position  2  3) (text "Define the sample string file to be used"))
  (label (position  2  4) (text "Location"))
  (label (position  2  5) (text "ID Number"))
  (label (position  2  6) (text "Assay field"))
  (label (position  2  7) (text "Thickness"))
  (label (position 27  7) (text "S. G."))
  (label (position  2  8) (text "(P)oint or (I)nterval samples"))
  (label (position  2  9) (text "Dilute blank or negative samples"))
  (label (position  2 10) (text "Define the description fields for the results"))
  (label (position  2 11) (text "Grade"))
  (label (position 27 11) (text "Mass"))
  (label (position  2 12) (text "Volume"))
  (label (position 27 12) (text "Area"))
  (label (position  2 13) (text "S. G."))
  (label (position 27 13) (text "Thickness"))
  (field "smploc" (position 12  4) (display_length 26) (input allowed)
    (translate lower) (null disallowed) (max_length 26)
    (file (link "smpid") (extension "*.str"))
    (help "00486_TIP_1"))
  (field "smpid" (position 12  5) (display_length 16) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16)
    (help (field "smploc")))
  (field "isamp_fld" (position 15  6) (display_length  5) (input allowed)
    (low_bound 1) (high_bound 100)
    (format integer_4) (null disallowed) (max_length 5)
    (help "00486_TIP_2"))
  (field "thickness" (position 15  7) (display_length  8) (input allowed)
    (low_bound 0.001) (high_bound 1000000)
    (translate upper) (format real_8) (null disallowed) (max_length 8)
    (help "00486_TIP_3"))
  (field "sg" (position 36  7) (display_length  8) (input allowed)
    (low_bound .001) (high_bound 100)
    (translate upper) (format real_8) (null disallowed) (max_length 8)
    (help "00486_TIP_4"))
  (field "pnt_or_int" (position 30  8) (display_length  1) (input allowed)
    (value_in "I" "P")
    (translate upper) (null allowed) (max_length 1)
    (help "00486_TIP_5"))
  (field "dilute_fld" (position 30  9) (display_length  1) (input allowed)
    (value_in "Y" "N")
    (translate upper) (null allowed) (max_length 1)
    (help "12023_TIP_8"))
  (field "igrade_fld" (position 12 11) (display_length  5) (input allowed)
    (low_bound 1) (high_bound 100)
    (format integer_4) (null disallowed) (max_length 5)
    (help "00486_TIP_6"))
  (field "ivol_fld" (position 12 12) (display_length  5) (input allowed)
    (low_bound 1) (high_bound 100)
    (format integer_4) (null disallowed) (max_length 5)
    (help "00486_TIP_7"))
  (field "isg_fld" (position 12 13) (display_length  5) (input allowed)
    (low_bound 1) (high_bound 100)
    (format integer_4) (null disallowed) (max_length 5)
    (help "00486_TIP_8"))
  (field "itonnes_fld" (position 36 11) (display_length  5) (input allowed)
    (low_bound 1) (high_bound 100)
    (format integer_4) (null disallowed) (max_length 5)
    (help "00486_TIP_9"))
  (field "iarea_fld" (position 36 12) (display_length  5) (input allowed)
    (low_bound 1) (high_bound 100)
    (format integer_4) (null disallowed) (max_length 5)
    (help "00486_TIP_10"))
  (field "ithick_fld" (position 36 13) (display_length  5) (input allowed)
    (low_bound 1) (high_bound 100)
    (format integer_4) (null disallowed) (max_length 5)
    (help "00486_TIP_11"))
  (default_buttons)
)
