(form "00591" (size 52  8)
  (help "")
  (heading "PROCESSING INTERRUPT ABORT")
  (label (position  2  3) 
         (text "The current function has been interrupted by the ABORT key"))
  (label (position  2  4) 
         (text "Press APPLY to confirm that the function is to be ABORTED."))
  (label (position  2  5) 
         (text "Press CANCEL to continue processing."))
  (default_buttons)
)
