(form "00670" (size 55 13)

  (help "00670_TIP_0")

  (heading "ENTER GRID MESH PARAMETERS" )

  (label (position  2 3) 
  (text "Y coordinate of grid origin" )
  )
  (field "ycoord" (position 25 3) (display_length 16)
     (input allowed)
     (null disallowed)
     (translate upper)
     (format real_8)
     (max_length 16)
     (help "00670_TIP_1")
  )

  (label (position  2 4) 
  (text "X coordinate of grid origin" )
  )
  (field "xcoord" (position 25 4) (display_length 16)
     (input allowed)
     (null disallowed)
     (translate upper)
     (format real_8)
     (max_length 16)
     (help "00670_TIP_2")
  )

  (label (position  2 5) 
  (text "Z coordinate of grid origin" )
  )
  (field "zcoord" (position 25 5) (display_length 16)
     (input allowed)
     (null disallowed)
     (translate upper)
     (format real_8)
     (max_length 16)
     (help "00670_TIP_3")
  )
  (label (position  2 6) 
  (text "Y extent of grid" )
  )
  (field "extent_y" (position 25 6) (display_length 16)
     (input allowed)
     (null disallowed)
     (translate upper)
     (format real_8)
     (low_bound 0.001)
     (max_length 16)
     (help "00670_TIP_4")
  )

  (label (position  2 7) 
  (text "X extent of grid" )
  )
  (field "extent_x" (position 25 7) (display_length 16)
     (input allowed)
     (null disallowed)
     (translate upper)
     (format real_8)
     (low_bound 0.001)
     (max_length 16)
     (help "00670_TIP_5")
  )
  (label (position  2 8) 
  (text "Y grid step size" )   
  )
  (field "step_y" (position 25 8) (display_length 16)
     (input allowed)
     (null disallowed)
     (translate upper)
     (format real_8)
     (low_bound 0.001)
     (max_length 16)
     (help "00670_TIP_6")
  )

  (label (position  2 9) 
  (text "X grid step size" )
  )
  (field "step_x" (position 25 9) (display_length 16)
     (input allowed)
     (null disallowed)
     (translate upper)
     (format real_8)
     (low_bound 0.001)
     (max_length 16)
     (help "00670_TIP_7")
  )
  (label (position  2 10) 
  (text "Angle of grid orientation" )
  )
  (field "grid_angle" (position 25  10) (display_length  16)
   (null disallowed) (format real_8)
   (low_bound 0.0) (high_bound 360.0)
   (input allowed) (max_length 16)
   (help "00670_TIP_8")
  )
  (default_buttons)

)
