(form "00672" (size 50 19)
  (help "00672_TIP_0")
  (heading "SEARCH PARAMETERS")
  (label (position  4  3) (text "Search type"))
  (label (position  4  5) (text "Minimum number of samples to select"))
  (label (position  4  6) (text "Maximum number of samples to select"))
  (label (position  4  8) (text "Maximum search radius"))
  (label (position  4 10) 
    (text "Maximum number of adjacent octants with no samples"))
  (label (position  4 12) (text "SEARCH ELLIPSE SPECIFICATION"))
  (label (position  4 13) (text "Bearing of major axis"))
  (label (position 4 15) (text "ANISOTROPY RATIO"))
  (label (position 4 16) (text "major / minor"))
  (field "search" (position 17  3) (display_length  10) (input allowed)
    (value_in "ELLIPSE" "OCTANT")
    (default "ELLIPSE")
    (translate upper) (null allowed) (max_length 9) 
    (help "00672_TIP_1"))
  (field "minsamples" (position 38  5) (display_length  2) (input allowed)
    (low_bound 1) (high_bound 50) (default "3")
    (format integer_2) (null disallowed) (max_length 2) 
    (help "00672_TIP_2"))
  (field "maxsamples" (position 38  6) (display_length  4) (input allowed)
    (low_bound 1) (default "15")
    (format integer_2) (null disallowed) (max_length 4)
    (help "00672_TIP_3"))
  (field "majordist" (position 33  8) (display_length 10) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16) 
    (help "00672_TIP_4"))
  (field "adjoct" (position 40  10) (display_length  2) (input allowed)
    (format integer_2) (null disallowed) (max_length 2)
    (dependency (value "search") == "OCTANT")
    (help "00672_TIP_5"))
  (field "majorbrg" (position 26  13) (display_length  6) (input allowed)
    (translate upper) (format real_8) (low_bound 0.0) (high_bound 360.0) 
    (null disallowed) (max_length 6)
    (default "0")
    (help "00672_TIP_6"))
  (field "minorfact" (position 26 16) (display_length  5) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 5)
    (default "1")
    (help (field "majorbrg")))
  (default_buttons)
)
