(form "00682" (size 50 10)
  (heading "GRAPHICAL DISPLAY OF DATA" )
   (label
	(position 2 3)
	(text "The Grid Model is based on the graphical display of input data ")
    )
   (label
    (position 2 4)
	(text "and output results. ")
    )

   (label
	(position 2 5)
	(text "It is therefore recommended that you recall the string file that ")
   )
   (label
	(position 2 6)
	(text "contains the data you wish to use for the interpolations into ")
   )
   (label
	(position 2 7)
	(text "the current graphics layer. ")
   )
  (menu (position 20 9) (size 9 1)
    (item (text "Continue" )
          (function "Continue")
    )
  )

)
