(form "00705" (size 75 20)
  (help "00705_TIP_0")
  (heading "SSI/CISAM Database Unload Driver")
  (label (position 2 3)
     (text "This database is being accessed using a very simple emulation of C-ISAM "))
  (label (position 2 4)
    (text "and the only operation supported is DATABASE UNLOAD."))
  (label (position 2 5)
    (text "Attempting to invoke any other function will result in an error message"))
  (label (position 2 6)
    (text "Surpac 1 geological databases (collar and geology tables) are not fully supported."))
  (label (position 2 8)
    (text "C-ISAM databases use one of two floating number formats depending on their creation platform."))
  (label (position 2 9)
    (text "LSB - Least Significant Byte first"))
  (label (position 10 10)
    (text "IBM PC (DOS/Windows 95/NT), DEC ALPHA (Digital UNIX/NT)"))
  (label (position 2 11)
    (text "MSB - Most Significant Byte first"))
  (label (position 10 12)
    (text "Sun (SunOS/Solaris2), HP/UX, AIX, IRIX, Ultrix"))
  (label (position 2 13)
    (text "Native - means to use the same format as the current platform"  ))
  (label (position 2 14)
    (text "Floating Point Type:"      ))
  (field "type_name" (position 20 14) (display_length 10) (input allowed)
     (value_in "native" "lsb" "msb")
     (null disallowed)
     (help "00705_TIP_1"))
  (label (position 2 15)
    (text     "Databases created on DOS have a maximum tablename length of 8 characters; "))
  (label (position 2 16)
    (text     "All others use 10."))
  (label (position 2 17)
    (text "Maximum table name length:"))
  (field "max_len" (position 30 17) (display_length 10) (input allowed)
     (format integer_4)
     (value_in non_exclusive "8" "10")
     (null disallowed)
     (help "00705_TIP_2"))
  (default_buttons)
)
