(form "00849" (size 60  14) (mismatch ignore)
  (help "FORM_00849_HELP")
  (heading "Options for new station")
  
  (label (position  2  3) (text "RESECTION_STATION_INTO_DB_TEXT_1"))
  (field "station" (position  12  3) (display_length 20) (max_length 20)
  (input disallowed))

  (label (position  2  4) (text "RESECTION_STATION_INTO_DB_TEXT_2"))
  (field "insertion_option" (position 54  4) (display_length  1) (input allowed)
  (value_in "Y" "N")
  (default "Y") (translate upper) (null disallowed) (max_length 1))

  (label (position  2  5) (text "NEW_STATION_INTO_DB_TEXT_1"))

  (label (position 2  10) (text "RESECTION_STATION_INTO_DB_TEXT_5")) 
  (field "ug_option" (position 54  10) (display_length  20) (input allowed)
  (value_in "surface" "underground" )
  (default "surface") 
  (null disallowed) (max_length 20))

  (field "instrument_label" 
    (position 2  12) 
    (display_length  25) 
    (foreground (user_option "form_foreground"))
    (background (user_option "form_background"))
    (input disallowed)
    (value_in "Instrument used")
    (browser none)
    (default "Instrument used")
  )

  (field "instrument" (position 10 12) (display_length 10) (input allowed)
    (max_length 128)
    (null disallowed) 
    (help "SRV_INSTRUMENT_USED_TIP")
   )

  (default_buttons)
)
