(form "00856" (size 50 14)

  (heading "ERROR: New Station Order")

  (label (position  2  3) (text "Station"))
   (field "station" (position  20  3) (display_length 20)
   (input disallowed) (max_length 20))

  (label (position  2  4) (text "STATION_ERRORS_CASE"))
   (field "the_case" (position  20  4) (display_length 40)
   (input disallowed) (max_length 252))

  (label (position  2  6) (text "FRM_STAT_ERRS_ERROR_TEXT"))

  (menu (position 10 12) (size 5 1)
    (item "ok" (function "ok") (text "OK"))
  )

)
