(form "00863" (size 40 11)

  (heading "WARNING: New Station Order")

  (label (position  2  3) (text "Station"))
   (field "station" (position  20  3) (display_length 20)
   (input disallowed) (max_length 20))

  (label (position  2  4) (text "STATION_ERRORS_CASE"))
   (field "the_case" (position  20  4) (display_length 40)
   (input disallowed) (max_length 252))

  (label (position  2  6) (text "FRM_00863_WARNING_TEXT")) 

  (menu (position 10 8) (size 5 1)
    (item "ok" (function "ok") (text "OK"))
  )
  (menu (position 20 8) (size 5 1)
    (item "cancel" (function "cancel") (text "CANCEL"))
  )
)
