(form "00868" (size 50 21)

  (heading "ERROR: Resection Adjustment Values have exceeded allowable limits")

  (field "station" (position  20  3) (display_length 20)
  (input disallowed) (max_length 20))

  (field "stat_ycoord" (position  20  4) (display_length 20) (format real_8)
  (decimals 3) (input disallowed))

  (field "stat_xcoord" (position  20  5) (display_length 20) (format real_8)
  (decimals 3) (input disallowed))

  (field "stat_zcoord" (position  20  6) (display_length 20) (format real_8)
  (decimals 3) (input disallowed))

  (scroll_block (position  2  8) (size 80  6)
    (extra  0  1)
    (scroll_size 6 200)
    (repeat (grow  0  1) (instances  1 (min  1) (max 100)))
    (main)
    (top
     )
    (main
      (field "res_station" (position 1  0) (display_length 17) (input disallowed))
      (field "ha" (position 22  0) (display_length 8) (input disallowed))
      (field "ha_adj" (position 34  0) (display_length 8) (input disallowed))
      (field "va" (position 44  0) (display_length 8) (input disallowed))
      (field "va_adj" (position 54  0) (display_length 8) (input disallowed))
      (field "sd" (position 64  0) (display_length 10) (format real_8) 
                                   (decimals 3) (input disallowed))
      (field "sd_adj" (position 74  0) (display_length 10) (input disallowed))
      (field "sd_adj_ppm" (position 84  0) (display_length 10) (format real_8) (decimals 3)
                          (input disallowed)))
  )

  (field "res_stat_errs_ha" (position  20  10) (display_length 20)
  (input disallowed) (max_length 20))

  (field "res_stat_errs_va" (position  20 11) (display_length 20)
  (input disallowed) (max_length 20))

  (field "res_stat_errs_sd" (position  20  12) (display_length 20)
  (input disallowed) (max_length 20))

  (menu (position 10 18) (size 5 1)
    (item "ok" (function "ok"))
  )

)
