(form "01310"
    (size 50 17)
    (heading "STAGGERED DESIGN GRID PARAMETERS"
    )

    (label 
        (position  2 4)
        (text "Grid layer name" 
        )
    )
    (field "name" 
        (position 20 4) 
        (display_length 20)
        (input allowed)
        (null disallowed)
        (translate upper)
        (max_length 32)
        )
    (label 
        (position  2 3)
        (text "Grid string number" 
        )
    )
    (field "string_no" 
        (position 20 3) 
        (display_length 5)
        (input allowed)
        (null disallowed)
        (format integer_4)
        (max_length 5)
        (low_bound 1)
        (high_bound 32000)
        )
    (label 
         (position  2 6)
         (foreground (user_option "form_text_highlight"))
         (text "Define the Origin of the grid"
         )

    )
    (label 
         (position  2 7)
         (text "Y"
         )
    )
    (field "Y" 
         (position 4 7)
         (display_length 10)
         (input allowed)
         (null disallowed)
         (format real_8)
         (max_length 16)
         )
    (label 
         (position  17 7)
         (text "X"
         )
    )
    (field "X" 
         (position 19 7)
         (display_length 10)
         (input allowed)
         (null disallowed)
         (format real_8)
         (max_length 16)
         )
    (label 
         (position  32 7)
         (text "Z"
         )
    )
    (field "Z" 
         (position 34 7)
         (display_length 10)
         (input allowed)
         (null disallowed)
         (format real_8)
         (max_length 16)
         )
     (label 
         (position  20 9)
         (text "Y" 
         )
     )

     (label 
         (position  34 9)
         (text "X" 
         )
     )

    (label 
         (position  2 10)
         (foreground (user_option "form_text_highlight"))
         (text "Grid Step Size" 
         )
     )

     (label 
         (position  2 11)
         (foreground (user_option "form_text_highlight"))
         (text "Staggered Grid Offsets" 
         )
     )

     (label 
         (position  2 12)
         (foreground (user_option "form_text_highlight"))
         (text "Number of Nodes" 
         )
     )

     (label 
         (position  2 13)
         (foreground (user_option "form_text_highlight"))
         (text "Dimensions of the grid"
         )
     )

     (field "step_width" 
         (position 20 10) 
         (display_length 10)
         (input allowed)
         (null disallowed)
         (translate upper)
         (format real_8)
         (low_bound 0.001)
         (max_length 16)
         )

     (field "step_length" 
         (position 34 10) 
         (display_length 10)
         (input allowed)
         (null disallowed)
         (translate upper)
         (format real_8)
         (low_bound 0.001)
         (max_length 16)
         )

     (field "width_offset" 
         (position 20 11)
         (display_length 10)
         (input allowed)
         (null allowed)
         (format real_8)
         (low_bound 0.001)
         (max_length 16)
         )

     (field "length_offset" 
         (position 34 11) 
         (display_length 10)
         (input allowed)
         (null disallowed)
         (format real_8)
         (low_bound 0.001)
         (max_length 16)
         )

     (field "node_width" 
         (position 20 12) 
         (display_length 10)
         (input allowed)
         (null disallowed)
         (format integer_4)
         (low_bound 1)
         (max_length 16)
         )

     (field "node_length" 
         (position 34 12) 
         (display_length 10)
         (input allowed)
         (null disallowed)
         (format integer_4)
         (low_bound 1)
         (max_length 16)
         )

     (field "width" 
         (position 20 13)
         (display_length 10)
         (input disallowed)
         (null disallowed)
         (format real_8)
         (low_bound 0.001)
         (max_length 16)
     )

     (field "length" 
         (position 34 13) 
         (display_length 10)
         (input disallowed)
         (null disallowed)
         (format real_8)
         (low_bound 0.001)
         (max_length 16)
     )

     (label 
         (position  20 14)
         (text "Dimension = Step Size * Number of Nodes"
         )
     )

     (default_buttons)
)
