(form "10020" (size 66  8)
  (help "10020_TIP_0")
  (heading "CHOOSE DATABASE TYPE")
  (label (position  2  3) (text "Database Name"))
  (label (position  2  4) (text "Database Type"))
  (label (position  2  5) (text "ODBC connect string"))
  (label (position 20  6) (text "y x z survey and sample co-ordinates"))
  (field "dbname" (position 25  3) (display_length 36)
    (background) (input disallowed))
  (field "dbtyp" (position 25  4) (display_length  10) (input allowed)
    (translate lower) (null allowed) (max_length 10)
    (help "CREATE_DATABASE_TYPE_TIP"))
  (field "odbc_str" (position 25 5) (display_length 25) (input allowed)
    (translate none) (null allowed) (max_length 100)
    (dependency (value "dbtyp") == "odbc")
    (help "10020_TIP_2"))
  (field "xyzcal" (position  2  6) (display_length 15) (input allowed)
    (value_in "STORED" "CALCULATED")
    (default "CALCULATED") (translate upper) (null allowed) (max_length 12)
    (help "10020_TIP_3"))
  (default_buttons)
)
