(form "10050" (size 55  6)
  (help "10050_TIP_0")
  (heading "SELECT FORMAT FILE FOR LOAD / UNLOAD")
  (label (position  2  3) (text "Database Name"))
  (label (position  2  4) (text "Format File Name"))
  (label (position  2  5) (text "REPORT_FILE_NAME"))
  (field "dbname" (position 20  3) (display_length 24)
    (background) (input disallowed))
  (field "dsc_file" (position 20  4) (display_length 24) (input allowed)
    (translate lower) (null disallowed) (max_length 256)
    (file (extension trim "*.dsc"))
    (help "10050_TIP_1"))
  (field "filename" (position 20 5) (display_length 24) (max_length "FIO_MAX_FILENAME_LENGTH")
        (translate lower) (input allowed) (null disallowed)
        (file output (extension trim "reports|*.log"))
        (help   "REPORT_FILE_NAME_TIP"))
  (label (position  2  6) (text "Format"))
  (field "report_format" (position 20 6) (display_length 18.5)
    (input allowed) (null allowed)
    (value_in ".not - Surpac Note File"
              ".csv - Comma Separated (Spreadsheet)"
              ".htm - Hypertext Markup Language (Web)"
              ".html - Hypertext Markup Language (Web)"
              ".rtf - Rich Text Format (Microsoft Word)"
              ".pdf - Adobe Acrobat"
              ".ps - Postscript"
              ".log - Surpac log file"))
  (default_buttons)
)
