(form "10060" (size 68  7) (mismatch ignore)
  (heading "VERIFY CLEARING OF DATABASE")  
  (field "db_nam" (position 30  3) (display_length 32)
    (background) (input disallowed))
  (field "conf" (position 12  5) (display_length  1) (input allowed)
    (value_in "Y" "N")
    (translate upper) (null allowed) (max_length 1)
    )
  (default_buttons)
)
