(form "10062" (size 68  6) (mismatch ignore)
  (help "10062_TIP_0")
  (heading "SELECT MAXIMUM NUMBER OF ERRORS ALLOWED IN LOAD")
  (label (position  2  3) 
    (text "How many errors are allowed during load ?"))
  (field "numerr" (position 46  3) (display_length 10) (input allowed)
    (format integer_4) (null disallowed) (max_length 10)
    (help "10062_TIP_1"))
  (default_buttons)
)
