(form "10123" (size 40 16)
  (help "SRV_REVIEW_DATA_TIP")
  (heading "Review Underground Station Co-ordinates")
  (scroll_block "main" (position 4 5) (size 28 10)
    (extra  0  1)
    (scroll_size 28 60)
    (repeat interactive (grow  0  1) (instances  1 (min  1) (max 60)))
    (top
      (label (position  1  0) (text "Field Name"))
      (label (position 16  0) (text "Value"))
    )
    (main
      (field "field" (position  1  0) (display_length  12) 
        (background)
        (translate lower) (input disallowed) (null allowed) 
      )
      (field "value" (position  16  0) (display_length  32) 
        (input allowed) (max_length 32) (null allowed) (decimals 3)
        )
    )
   )
  (default_buttons)
)
