(form "10126" (size 58  9) (mismatch ignore)
  (help "FRM10126_HELP")
  (heading "Confirm station overwrite")
   (label (position  2  3) (text "Station"))
   (label (position  2  5) (text "FRM10126_OVERWRITE_TEXT"))
   (field "station" (position  12  3) (display_length 20) (max_length 20) 
   (input disallowed))
  (default_buttons)
)
