(form "10128" (size 58  10) (mismatch ignore)
  (heading "Confirm setup station overwrite?")
   (label (position  2  3) (text "Setup station"))
   (label (position  2  5) (text "FRM10128_TEXT"))
   (field "station" (position  20  3) (display_length 20)
   (input disallowed) (max_length 20))
  (default_buttons)
)
