(form "10147" (size 48  9)
  (help "10147_TIP_0")
  (heading "UNDERGROUND STOPE OR DRIVE PICK UPS")
  (label (position  2  3) (text "Database Name"))
  (label (position  2  5) (text "Define file to be recalled"))
  (label (position  2  6) (text "Location"))
  (label (position  2  7) (text "ID number"))
  (field "svtype" (position  2  2) (display_length 19)
    (background) (input disallowed))
  (field "dbname" (position 20  3) (display_length 18)
    (background) (input disallowed))
  (field "inploc" (position 14  6) (display_length 26) (input allowed)
    (null disallowed) (max_length 26)
    (file (link "inpid") (extension "*.dat"))
    (help "10147_TIP_1"))
  (field "inpid" (position 14  7) (display_length 16) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16)
    (help "10147_TIP_2"))
  (default_buttons)
)
