(form "10149" (size 55 16)
  (heading "UNDERGROUND PICK UPS - RADIATION SURVEYS")
  (label (position  2  3) (text "Database Name"))
  (label (position  2  5) (text "Set Up On Station"))
  (label (position  2  6) (text "Station Id"))
  (label (position  2  7) (text "Station to Instrument Axis"))
  (label (position  2  9) (text "Backsight Station"))
  (label (position  2 10) (text "Station Id"))
  (label (position  2  12) (text "String Number for Backs"))
  (label (position  2  13) (text "String Number for Floor"))
  (label (position  2  14) (text "Face for vertical angles"))
  (field "dbname" (position 20  3) (display_length 18)
    (background) (input disallowed))
  (field "setupon" (position 26  6) (display_length 26) (input allowed)
    (translate upper) (null disallowed) (max_length 26) (value_in non_exclusive)
    )
  (field "sta2ins" (position 26  7) (display_length  9) (input allowed)
    (low_bound -50.0) (high_bound 50.0)
    (translate upper) (format real_8) (null disallowed) (max_length 9)
    )
  (field "backsigh" (position 26 10) (display_length 26) (input allowed)
    (translate upper) (null disallowed) (max_length 26) (value_in non_exclusive)
    )
  (field "back_string" (position 26  12) (display_length 5 ) (input allowed)
    (format integer_4) (null disallowed) (low_bound 1)
    )
  (field "floor_string" (position 26  13) (display_length  5) (input allowed)
    (format integer_4) (null disallowed) (low_bound 1)
    )
  (field "faceopt" (position 26  14) (display_length  1) (input allowed)
    (value_in "L" "R" ) (null disallowed)
    (translate upper) (max_length 1)
    )
  (default_buttons)
)
