(form "10154" (size 60 16)
  (help "10154_TIP_0")
  (heading "UNDERGROUND RADIATION SURVEY")
  (label (position  2  3) (text "Database Name"))
  (field "dbname" (position 20  3) (display_length 18)
    (background) (input disallowed))
  (scroll_block (position  2  5) (size 56  10) (extra  0  1)
    (scroll_size 56 200) (repeat interactive (grow  0  1) 
    (instances  1 (min  1) (max 200)))
    (top
      (label (position 1  0) (text "Slope Dist."))
      (label (position 11  0) (text "Vert. Circle"))
      (label (position 22  0) (text "Horiz. Circle"))
      (label (position 33  0) (text "Up"))
      (label (position 44  0) (text "Down"))
    )
    (main
      (field "slodst" (position 1  0) (display_length  8) (input allowed)
        (translate upper) (format real_8) (null disallowed) (max_length 8)
        (help "10154_TIP_1"))
      (field "vcircl" (position 11  0) (display_length  9) (input allowed)
        (translate upper) (format dms_angle) (null disallowed) (max_length 9)
        (low_bound -6.283185307) (high_bound 6.283185307)
        (initialise (value "vcircl(-1)"))
        (help "10154_TIP_2"))
      (field "hcircl" (position 22  0) (display_length  9) (input allowed)
        (translate upper) (format dms_angle) (null disallowed) (max_length 9)
        (low_bound 0) (high_bound 6.283185307) 
        (help "10154_TIP_3"))
      (field "up" (position 33  0) (display_length  7) (input allowed)
        (translate upper) (format real_8) (null disallowed) (max_length 7)
        (initialise (value "up(-1)"))
        (help "10154_TIP_4"))
      (field "down" (position 44  0) (display_length  7) (input allowed)
        (translate upper) (format real_8) (null disallowed) (max_length 7)
        (initialise (value "down(-1)"))
        (help "10154_TIP_5"))
    )
  )
  (default_buttons)
)
