(form "10155" (size 65 13)
  (help "10155_TIP_0")
  (heading "UNDERGROUND PICK UPS - CONFIRM STATIONS")
  (label (position  2  3) (text "Database Name"))
  (label (position  2  5) (text "Set Up On Station"))
  (label (position  2  6) (text "Station Id"))
  (label (position  2  8) (text "Foresight Station"))
  (label (position  2  9) (text "Station Id"))
  (label (position  2 11) (text "Calculated Distance :"))
  (label (position 32 11) (text "Chained Distance :"))
  (field "dbname" (position 20  3) (display_length 18)
    (background) (input disallowed))
  (field "svtype" (position 44  3) (display_length 19)
    (background) (input disallowed))
  (field "setupon" (position 24  6) (display_length 26)
    (background) (input disallowed))
  (field "foresigh" (position 24  9) (display_length 26)
    (background) (input disallowed))
  (field "calcdist" (position 20 11) (display_length  9)
    (background) (input disallowed))
  (field "chdist" (position 49 11) (display_length  9)
    (background) (input disallowed))
  (default_buttons)
)
