(form "12020" (size 46  10)
  (help "12020_TIP_0")
  (heading "DISPLAY DRILL HOLE SECTIONS/PLANS")
  (label (position  5  3) (text "Define the range of section/plan files"))
  (label (position  5  4) (text "Location"))
  (label (position  5  5) (text "ID range"))
  (label (position  5  6) (text "Always Update Display"))
  (label (position  5  7) (text "Always Rescale Display"))
  (field "loc" (position 20  4) (display_length 20) (input allowed)
    (max_length 26)
    (translate lower) (null allowed)
    (file (link "idrange") (extension "*.str"))
    (help "12020_TIP_1"))
  (field "idrange" (position 20  5) (display_length 20) (input allowed)
    (max_length 32)
    (format range) (null disallowed)
    (help "12020_TIP_2"))
  (field "update" (position 20  6) (display_length  3) (input allowed)
    (value_in "Yes" "No")
    (default "No")
    (null disallowed) (max_length 3)
    (help "12020_TIP_3"))
  (field "rescale" (position 20  7) (display_length  3) (input allowed)
    (value_in "Yes" "No")
    (default "No")
    (null disallowed) (max_length 3)
    (help "12020_TIP_4"))
  (default_buttons)
)
