(form "12027" (size 47  8)
  (help "12027_TIP_0")
  (heading "DISPLAY FIELD RANGE")
  (label (position  2  3) (text "Define the table number and range of fields to display"))
  (label (position  2  4) (text "Table number"))
  (label (position  2  5) (text "Field range"))
  (label (position  2  6) (text "Dilute blank or negative samples"))
  (field "table" (position 15  4) (display_length  2) (input allowed)
    (low_bound 1) (high_bound 5)
    (format integer_4) (null disallowed) (max_length 2)
    (help "12027_TIP_1"))
  (field "drange" (position 15  5) (display_length 10) (input allowed)
    (translate lower) (null allowed) (max_length 32)
    (help "12027_TIP_2"))    
  (field "dilute" (position 37  6) (display_length  1) (input allowed)
    (value_in "Y" "N")
    (translate upper) (null allowed) (max_length 1)
    (help "12027_TIP_3"))
  (default_buttons)
)
