(form "13001" (size 61 15)
  (help "13001_TIP_0")
  (heading "RING PARAMETERS")
  (label (position  5  3) (text "Define Drill Geometry"))
  (label (position  8  4) (text "Location Name"))
  (label (position  8  5) (text "Id Number"))
  (label (position  5  6) (text "Toe Spacing"))
  (label (position 30  6) (text "Tolerance"))
  (label (position  5  7) (text "Define the Minimum Collar Distance"))
  (label (position  5  8) (text "Define the Amount of OVERDRILL"))
  (label (position  5  9) (text "Direction of Ring"))
  (label (position  5 10) (text "Drill Holes Defined by Bearings?"))
  (label (position  5 11) (text "Enter Bearing"))
  (label (position  5 12) (text "Critical Radius for Charging"))
  (field "rig_loc" (position 26  4) (display_length 26) (input allowed)
    (translate lower) (null disallowed) (max_length 26)
    (file (link "rig_id") (extension "*.str"))
    (help "13001_TIP_1"))
  (field "rig_id" (position 26  5) (display_length 10) (input allowed)
    (low_bound -999999.9) (high_bound 999999.9)
    (translate upper) (format real_8) (null disallowed) (max_length 10)
    (help "13001_TIP_2"))
  (field "toe" (position 17  6) (display_length  8) (input allowed)
    (low_bound 0.1) (high_bound 100.0)
    (translate upper) (format real_8) (null disallowed) (max_length 8)
    (help "13001_TIP_3"))
  (field "tolerance" (position 40  6) (display_length  8) (input allowed)
    (low_bound 0) (high_bound 100)
    (translate upper) (format real_8) (null disallowed) (max_length 8)
    (help "13001_TIP_4")) 
  (field "collardist" (position 40  7) (display_length  8) (input allowed)
    (low_bound 0) (high_bound 100)
    (translate upper) (format real_8) (null disallowed) (max_length 8)
    (help "13001_TIP_5"))
  (field "overdrill" (position 40  8) (display_length  8) (input allowed)
    (low_bound -100) (high_bound 100)
    (translate upper) (format real_8) (null disallowed) (max_length 8)
    (help "13001_TIP_6"))
  (field "ring_direction" (position 40  9) (display_length  1) (input allowed)
    (value_in "c" "a")
    (translate lower) (null allowed) (max_length 1)
    (help "13001_TIP_7"))
  (field "bearing reqd" (position 40 10) (display_length  1) (input allowed)
    (value_in "y" "n")
    (translate lower) (null allowed) (max_length 1)
    (help "13001_TIP_8"))
  (field "bearing" (position 40 11) (display_length  8) (input allowed)
    (dependency (value "bearing reqd") == "y")
    (low_bound -360) (high_bound 360)
    (translate upper) (format real_8) (null disallowed) (max_length 8)
    (help "13001_TIP_9"))
  (field "crit radius" (position 40 12) (display_length  8) (input allowed)
    (low_bound 0) (high_bound 100)
    (translate upper) (format real_8) (null disallowed) (max_length 8)
    (help "13001_TIP_10"))
  (default_buttons)
)
