(form "13002" (size 51  6)
  (help "13002_TIP_0")
  (heading "MOVE RIG BY CO-ORDINATES")
  (label (position  5  3) (text "New X-Coordinate for Rig"))
  (field "move coord" (position 35  3) (display_length 10) (input allowed)
    (max_length 16)
    (translate upper) (format real_8) (null disallowed)
    (help "13002_TIP_1"))
  (default_buttons)
)
