(form "20046" (size 58  9)
  (heading "NORMAL SECTION SPECIFICATION")

  (label (position  2  5) 
    (text "Normal sections are a simple method of defining "))
  (label (position  2  6) 
    (text "a plane of fixed X,Y or Z value and no defined size."))

  (field "axis" (position  6  3) (display_length 12) 
    (background) (input disallowed) )
  (field "axis_value" (position 17 3) (display_length 10) (input allowed)
    (format real_8) )

  (default_buttons)
)
