(form "20080" (size 70 19)
  (heading "SEARCH PARAMETERS")
  (label (position  4  3) (text "Search type"))
  (label (position  4  5) (text "Minimum number of samples to select"))
  (label (position  4  6) (text "Maximum number of samples to select"))        
  (label (position  4  8) (text "Maximum search radius"))
  (label (position  4  9) (text "Maximum vertical search distance"))
  (label (position  4 11) 
    (text "Maximum number of adjacent octants with no samples"))
  (label (position  4 13) (text "SEARCH ELLIPSOID SPECIFICATIONS"))
  (label (position  4 14) (text "Bearing of major axis"))

  (label (position  4 16) (text "Dip of semi-major axis"))
  (label (position 37 14) (text "ANISOTROPY RATIOS")) 
  (label (position 37 15) (text "major / semi-major"))
  (label (position 37 16) (text "major / minor"))
  (field "search" (position 17  3) (display_length  10) (input allowed)
    (value_in "ELLIPSOID" "OCTANT")
    (default "ELLIPSOID")
    (translate upper) (null allowed) (max_length 9) 
    )
  (field "minsamples" (position 38  5) (display_length  2) (input allowed)
    (low_bound 1) (high_bound 50) (default "3")
    (format integer_2) (null disallowed) (max_length 2) 
    )
  (field "maxsamples" (position 38  6) (display_length  4) (input allowed)
    (low_bound 1) (default "15")
    (format integer_2) (null disallowed) (max_length 4)
    )
  (field "majordist" (position 33  8) (display_length 10) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16) 
    )
  (field "vertdist" (position 33  9) (display_length 10) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 16) 
    )
  (field "const_by_id" (position 33 10) (display_length  1) (input allowed)
    (value_in "Y" "N")
    (default "N") (translate upper) (null allowed) (max_length 1)
    )
  (field "desc_field" (position 33 11) (display_length 5) (input allowed)
    (default "d2") (translate upper) (null disallowed) (max_length 32) 
    (value_in non_exclusive "d1" "d2" "d3" "d4" "d5" "d6" "d7" "d8" "d9" "d10"
     "d11" "d12" "d13" "d14" "d15" "d16" "d17" "d18" "d19" "d20")           
    )
  (field "max_samp_per_id" (position 33 12) (display_length 10) (input allowed)
    (default "15")(translate upper) (format integer_2) (null disallowed) (max_length 16) 
    )
  (field "adjoct" (position 47  11) (display_length  2) (input allowed)
    (format integer_2) (null disallowed) (max_length 2)
    (dependency (value "search") == "OCTANT")
    )
  (field "axis_1" (position 26  14) (display_length  6) (input allowed)
    (max_length 6) (default "0")
    )
  (field "axis_2" (position 26  16) (display_length  6) (input allowed)
    (max_length 6) (default "0"))
  (field "axis_3" (position 26  15) (display_length  6) (input allowed)
    (max_length 6) (default "0"))
  (field "semimajfact" (position 57  15) (display_length  5) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 5)
    (default "1")
    (help (field "majorbrg")))
  (field "minorfact" (position 57 16) (display_length  5) (input allowed)
    (translate upper) (format real_8) (null disallowed) (max_length 5)
    (default "1")
    (help (field "majorbrg")))
  (field "string_file_source" (position 57 17) (display_length  1) (input allowed)
    (value_in "true" "false")
    (default "true") (null disallowed) (max_length 20))


  (field "rotationTypes" (position  15  0) (display_length  20) (max_length 25)
      (input allowed) (null allowed))

  (field "first_axis_rotation" (position 17  3) (display_length  10) (input allowed)
      (translate upper) (null allowed) (max_length 9) 
      (help ""))

  (field "sec_axis_rotation" (position 17  3) (display_length  10) (input allowed)
    (translate upper) (null allowed) (max_length 9) 
    (help ""))

  (field "third_axis_rotation" (position 17  3) (display_length  10) (input allowed)
    (translate upper) (null allowed) (max_length 9) 
    (help ""))

  (field "sec_axis" (position 17  3) (display_length  10) (input allowed)
    (translate upper) (null allowed) (max_length 9) 
    (help ""))
  (field "third_axis" (position 17  3) (display_length  10) (input allowed)
    (translate upper) (null allowed) (max_length 9) 
    (help ""))

  (field "majorbrg" (position 26  14) (display_length  6) (input allowed)
    (max_length 6)
    )
  (field "dip" (position 26  15) (display_length  6) (input allowed)
    (max_length 6))
  (field "tilt" (position 26  16) (display_length  6) (input allowed)
    (max_length 6))

  (default_buttons)

)
