(form "20420" (size 44 7)
    (help "20420_TIP_0")
    (heading "TRANSFORM"
    )

    (label
        (position 2 3)
        (text "Select transform"
        )
    )
    (field "trans"
        (position 19 3)
        (display_length 20)
        (input allowed)
        (value_in
            "None"
            "Log10"
            "Log10 (scale)"
            "Log10 (with constant)"
            "Log10 (with constant) (scale)"
            "Natural Log"
            "Natural Log (with constant)"
            "Natural Exponential"
            "Power"
            "Box & Cox"
            "Standardisation"
            "Scale Up"
            "Scale Down"
        )
        (default "None")
        (null disallowed)
    )

    (label
        (position 2 4)
        (text "Constant"
        )
    )
    (field "const"
        (position 19 4)
        (display_length 5)
        (input allowed)
        (format real_8)
        (default "1.0")
        (help "20420_TIP_1")
    )
         
    (default_buttons)
)
