(form "20430" (size 57 20)
    (help "20430_TIP_0")
    (heading "STATISTICS"
    )

    (label
        (position 2 3)
        (text "Variable"
        )
    )
    (field "variable"
        (position 10 3)
        (display_length 15)
        (foreground (user_option "form_text_highlight"))
        (background (user_option "form_background"))
        (input disallowed)
    )

    (label
        (position 27 3)
        (text "Transformation"
        )
    )
    (field "trans"
        (position 40 3)
        (display_length 15)
        (foreground (user_option "form_text_highlight"))
        (background (user_option "form_background"))
        (input disallowed)
    )

    (label
        (position 2 5)
        (text "Number of samples"
        )
    )
    (field "num"
        (position 18 5)
        (display_length 15)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (input disallowed)
    )

    (label
        (position 2 6)
        (text "Minimum :"
        )
    )
    (field "min"
        (position 12 6)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 27 6)
        (text "Maximum :"
        )
    )
    (field "max"
        (position 43 6)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 2 8)
        (text "Mean :"
        )
    )
    (field "mean"
        (position 12 8)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 2 9)
        (text "Variance :"
        )
    )
    (field "variance"
        (position 12 9)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 27 8)
        (text "Standard Deviation :"
        )
    )
    (field "sdev"
        (position 43 8)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 27 9)
        (text "Coeff. of Variation :"
        )
    )
    (field "cv"
        (position 43 9)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 2 11)
        (text "Skewness :"
        )
    )
    (field "skewness"
        (position 12 11)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 27 11)
        (text "Kurtosis :"
        )
    )
    (field "kurtosis"
        (position 43 11)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 2 13)
        (text "Median :"
        )
    )
    (field "median"
        (position 12 13)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 2 14)
        (text "Trimean :"
        )
    )
    (field "trimean"
        (position 12 14)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 27 13)
        (text "Biweight :"
        )
    )
    (field "biweight"
        (position 43 13)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 27 14)
        (text "MAD :"
        )
    )
    (field "mad"
        (position 43 14)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 2 15)
        (text "Alpha :"
        )
    )
    (field "alpha"
        (position 12 15)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 27 15)
        (text "Sichel-t :"
        )
    )
    (field "sichel"
        (position 43 15)
        (display_length 10)
        (foreground (user_option "form_foreground"))
        (background (user_option "form_background"))
        (decimals 3)
        (input disallowed)
    )

    (label
        (position 2 17)
        (text "REPORT_FILE_NAME"
        )
    )
    (field "fname"
        (position 12 17)
        (display_length 13)
        (max_length 40)
        (translate lower)
        (input allowed)
        (null allowed)
        (file output
            (extension "reports|*.not")
        )
        (default "")
        (help   "REPORT_FILE_NAME_TIP"
        )
    )
         
    (default_buttons)
)
