(form "70001" (size 40 6)

  (help "70001_TIP_0")

  (heading "SELECT RIG" )

  (label (position  2 3) (text "Rig name"))

  (field "name" (position 12 3) (display_length 17)
    (input allowed)
    (null disallowed) (max_length 20)
  )

  (menu (position 30 3) (size 8 1)
    (item (text "Default")
          (function "Default")
    )
  )

  (default_buttons)
)
