(form "70020" (size 40  7)

  (help "70020_TIP_0")

  (heading "MOVE MAST RELATIVE TO WALL" )

  (label (position  5  3) (text "Wall"))
  (label (position  5  4) (text "Distance"))

  (field "wall" (position 15  3) (display_length 12)
    (input allowed)
    (translate lower)
    (null disallowed)
    (value_in "left" "right" ) (default "left")
    (max_length 16)
    (help "70020_TIP_1")
  )

  (field "x_mvmt" (position 15  4) (display_length 12)
    (input allowed)
    (translate lower)
    (null disallowed)
    (format real_8)
    (default "1.0")
    (max_length 16)
    (decimals 3)
    (help "70020_TIP_2")
  )

  (default_buttons)
)
