(form "70056" (size 60  7)

  (heading "Enter a description to be stored in contact points' Dfields" )

  (label (position  2  3) (text "Enter Description"))
  (field "description" 
    (position 15  4) (display_length 20)
    (null allowed) (input allowed)
    (max_length 20)
    )

  (default_buttons)
)
